; 
;   THIS CODE AND INFORMATION IS PROVIDED "AS IS" WITHOUT WARRANTY OF ANY
;   KIND, EITHER EXPRESSED OR IMPLIED, INCLUDING BUT NOT LIMITED TO THE
;   IMPLIED WARRANTIES OF MERCHANTABILITY AND/OR FITNESS FOR A PARTICULAR
;   PURPOSE.
; 
;   Copyright (c) 1993, 1994  Microsoft Corporation.  All Rights Reserved.
; 

NAME	     MixTest

DESCRIPTION  'Wave mixer tester'

EXETYPE      WINDOWS	   ; required for all Windows applications

STUB	     'WINSTUB.EXE' ; Generates error message if application
			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     1024

; All functions that will be called by any Windows routine
; MUST be exported.

