Deskpro 3/25e  (Discontinued Unit)

FEATURES AND SPECIFICATION

CONFIGURATION

SPARE PART NUMBERS


FLOPPY DRIVE SPARES

Drive Size	Spare PN
360 KB	112567-001
1.2 MB	112566-001
1.44 MB *	112565-001
* Requires MS-DOS Version 3.31 Revision A if installed as drive B, and MS-DOS Version 3.31 Revision B if installed as drive A.


HARD DRIVES SPARES

Drive	Drive	Minimum	Controller
Size	Type	Interleave	Integrated	ROM	Spare PN	Assy No.
40 MB	43	1:1	Yes	P.6	112526-001	NA
40 MB	22	1:1	Yes	P.6	122187-001	NA
60 MB	55	1:1	Yes	P.6	122079-001	NA
84 MB	27	1:1	Yes	P.6	112438-001	NA
110 MB	33	1:1	Yes	P.6	112525-001	NA
120 MB	50	1:1	Yes	P.6	122080-001	NA
210 MB	51	1:1	Yes	P.6	124013-001	NA
320 MB	28	1:1	No	P.6	115182-001	001628
			WD1009
Hard Drive Expansion Unit (300/650 Megabyte)001472
			WD1009			001628


SYSTEM BOARD SPARES

			Switch/
Product	Assy No	Spare PN	Jumper
386 System Board	001427	122078-001	Yes
386 System Board	001918-001	122078-001	Yes
386 System Board *	001918-002	126527-001	Yes
* Integrated Advanced VGA.  Used only in systems with a "256 VGA" label applied to the back of unit.


CONTROLLERS SPARES

			Switch/
Product	Assy No	Spare PN	Jumper
Advanced ESDI Controller Board	WD1009	122370-001	Yes
Tape Adapter Board  (135 MB and 150/250 MB)	000774	113259-001	Yes
ESDI External 300/600 MB Hard Drive  Controller Board	001091	115839-001	Yed
15 MHz ESDI Controller Board	001628	121667-001	Yes
ESDI/Diskette Controller Board	001472	115374-001	Yes


ROMS SPARES

System ROM Revision for System Board

Assy Nos. 001427 and 001918-001

(Spare PN 112694-001)

Revision	PN on ODD ROM	PN on EVEN ROM
P.6	122095-001	122096-001
R.3	122095-002	122096-002
R.4	124049-001	124050-001

System ROM Revision for System Board

Assy No. 001918-002 (Spare PN 126551-001)

Revision	PN on ODD ROM	PN on EVEN ROM
021491	126545-003	126546-003
022691	126545-004	126546-004
061391	126545-005	126546-005


SYSTEM BOARDS - FEATURES & SPECS

Slots	Type

Slot 1	8/16 bit full sized

Slot 2	8/16 bit full sized

Slot 3	8/16 bit full sized

Slot 4	8/16 bit full sized

Slot 5	32 bit full sized (reserved for the 1 or 4 Megabyte 32 bit Memory Expansion Board)

System Unit

Dimensions:

	Height	5.9 in. (14.9 cm)
	Depth	14.8 in. (37.6 cm)
	Width	15.8 in. (40.1 cm)
Weight:

	Model 120	28.0 lb (12.7 kg)
	Model 60	28.0 lb (12.7 kg)
	Model 1	27.0 lb (12.2 kg)
Power Supply:

	Operating Voltage	120V, 60 Hz (220 - 240V, 50 Hz)
	Steady State Power	140W
	Peak Power	175W
Temperature Range:

	Operating	50oF to 104oF (10oC to 40oC)
	Nonoperating	-22oF to 140oF (-30oC to 60oC)
Relative Humidity (noncondensing):

	Operating	20% to 80% (20% to 80%)
	Nonoperating	5% to 90% (5% to 90%)


HARD DRIVE CONFIGURATION

Only two DIP switches affect hard drive operation.  On SW500 (DIP switch bank), switch #1 sets Primary diskette & Hard Drive address select (3FX & 1FX) when in the OFF position (default).  The ON position sets them to econdary (37X & 17X).

Switch #2 enables the Hard Drive when in the OFF position (default)


SYSTEM CONFIGURATION

386 System Board Switch Settings (Assy Nos. 001427, 001918)

Switch Settings

1	2	Function
ON		Enable integrated VGA/VGC (default)
OFF		Disable integrated VGA/VGC
	ON	Disable power on password
	OFF	Enable power on password (default)


VIDEO CONFIGURATION

Advanced Graphics 1024 Board (AG1024) Jumper Settings (Assy No. 109958)

Jumper W1 Setting	Function
1 - 2	Select address space 280h - 28Fh
2 - 3	Select address space 290h - 29Fh (default)


HARD DRIVE FEATURES & SPECS

Fixed Disk Drives	Quantity Supported	Drive Positions Supported	Controller Required
650 Megabyte Fixed DiskDrive	up to 4 external	Fixed Disk Expansion Unit	15 MHz ESDI (optional) (2 per controller)
320 Megabyte Fixed Disk Drive	1 *	F3	15 MHz ESDI (optional)
300 Megabyte Fixed DiskDrive	up to 4 external	Fixed Disk Expansion Unit	15 MHz ESDI (optional) (2 per controller)
210 Megabyte Fixed Disk Drive	up to 2	F3, R1	on System Board
120 Megabyte Fixed Disk Drive	up to 2	F3, R1, R2	on System Board
110 Megabyte Fixed Disk Drive	up to 2	F3, R1	on System Board
84 Megabyte Fixed Disk Drive	up to 2	F3, R1	on System Board
60 Megabyte Fixed Disk Drive	up to 2	F3, R1, R2	on System Board
40 Megabyte Fixed Disk Drive	up to 2	F3, R1, R2	on System Board
Fixed Disk Expansion UnitModel 650	up to 2	External	15 MHz ESDI (optional)
Fixed Disk Expansion UnitModel 300	up to 2	External	15 MHz ESDl (optional)


ROMS FEATURES & SPECS

System ROM Locations

U119 ODD

U141 EVEN


TAPE DRIVES FEATURES & SPECS

Tape Drives	Quantity Supported	Drive Positions Supported	Controller Supported
320/525 Megabyte Type Drive	1	F3	SCSI Option Adapter 2 *
150/250 Megabyte Tape Drive	1	F3	Tape Adapter 2 *
80/120 Megabyte Tape Drive with Compression	1	F3	on System Board
60 Megabyte Tape Drive with Compression	1	F3	on System Board

The 320 Megabyte Fixed Disk Drive is only supported in a Model 1.

*  Included with option kit.


MEMORY CONFIGURATION

There are no switch/jumper settings for the Memory boards installed in this unit.

Run Compaq Diagnostics Setup Utility after installing the memory.


CABLES SPARES

Description	Part Number
Fixed Disk Drive Signal Cable(40 Pin) Drive C (R1)	113595-001
Fixed Disk Drive Signal Cable  (40 Pin) Drive D (F3, R2	112528-001
Fixed Disk Drive Power Cable  (15 inch) Drive D, (F3, R2)	101741-004
Diskette/Tape Signal Cable (34 Pin) (All Diskette Drives and 40/60 Megabyte Tape Drives)	113594-001
Mass Storage Power (Y Type, 15 inch, Diskette and Tape)	113596-001
Mass Storage Power Cable (6 inch) (Fixed Disk Drive, Drive C) (R1)	101741-001


MISCELLANEOUS SPARES

Description	Part Number
Drive Bridge	124048-001
Dual Rear Drive Expansion Kit	122169-001
Rear Drive Bracket	112588-001
Fan Assembly	122569-001


SPARE PART NUMBERS  ** OBSOLETE **

FLOPPY DRIVES

HARD DRIVES

SYSTEM BOARD

CONTROLLERS

ROMS

CABLES

MISCELLANEOUS


FEATURES AND SPECIFICATION

SYSTEM BOARD

HARD DRIVE

ROMS

TAPE DRIVE


CONFIGURATION

HARD DRIVE

SYSTEM

VIDEO

MEMORY